References

[1] Albert Benveniste, Paul Caspi, Paul le Guernic, and Nicholas Halbwachs. Data-flow synchronous languages. In J.W. de Bakker, W.- P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 1–45. Springer-Verlag, Berlin-Heidelberg-New York- London-Paris-Tokyo-Hong Kong-Barcelona-Budapest, 1994.

[2] J.A. Bergstra, A. Ponse, and J.J. van Wamel. Process algebra with backtracking. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 46–91. Springer- Verlag, Berlin-Heidelberg-New York-London-Paris-Tokyo-Hong Kong- Barcelona-Budapest, 1994.

[3] Gérard Boudol. Some chemical abstract machines. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 92–123. Springer-Verlag, Berlin-Heidelberg-New York-London-Paris-Tokyo-Hong Kong-Barcelona-Budapest, 1994.

[4] E. Clarke, O. Grumberg, and D. Long. Verification tools for finitestate concurrent systems. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 124–175. Springer-Verlag, Berlin-Heidelberg-New York-London- Paris-Tokyo-Hong Kong-Barcelona-Budapest, 1994.

[5] Uffe Engberg and Glynn Winskel. Linear logic on petri nets. In J.W.

de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 176–229. Springer-Verlag, Berlin-Heidelberg- New York-London-Paris-Tokyo-Hong Kong-Barcelona-Budapest, 1994.

[6] Kurt Jensen. An introduction to the theoretical aspects of coloured petri nets. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 230–272. Springer- Verlag, Berlin-Heidelberg-New York-London-Paris-Tokyo-Hong Kong- Barcelona-Budapest, 1994.

[7] Yonit Kesten, Zohar Manna, and Amir Pnueli. Temporal verification of simulation and refinement. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 273–346. Springer-Verlag, Berlin-Heidelberg-New York-London- Paris-Tokyo-Hong Kong-Barcelona-Budapest, 1994.

[8] Leslie Lamport. Verification and specification of concurrent programs.

In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 347–374. Springer- Verlag, Berlin-Heidelberg-New York-London-Paris-Tokyo-Hong Kong- Barcelona-Budapest, 1994.

[9] N. Lynch. Simulation techniques for proving properties of real-time systems. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 375–424. Springer- Verlag, Berlin-Heidelberg-New York-London-Paris-Tokyo-Hong Kong- Barcelona-Budapest, 1994.

[10] Mogens Nielsen, Vladimiro Sassone, and Glynn Winskel. Relationships between models of concurrency. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 425–476. Springer-Verlag, Berlin-Heidelberg-New York-London- Paris-Tokyo-Hong Kong-Barcelona-Budapest, 1994.

[11] Joachim Parrow. Interaction diagrams. In J.W. de Bakker, W.- P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 477–508. Springer-Verlag, Berlin-Heidelberg-New York-London-Paris-Tokyo-Hong Kong-Barcelona-Budapest, 1994.

[12] Joachim Parrow and Davide Sangiorgi. Algebraic theories for namepassing calculi. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 509–529. Springer- Verlag, Berlin-Heidelberg-New York-London-Paris-Tokyo-Hong Kong- Barcelona-Budapest, 1994.

[13] Jan Rutten and Daniele Turi. Initial algebra and final coalgebra semantics for concurrency. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 530–582. Springer-Verlag, Berlin-Heidelberg-New York-London- Paris-Tokyo-Hong Kong-Barcelona-Budapest, 1994.

[14] Wolfgang Thomas and Helmut Lescow. Logical specifications of infinite computations. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 583–621. Springer- Verlag, Berlin-Heidelberg-New York-London-Paris-Tokyo-Hong Kong- Barcelona-Budapest, 1994.

[15] Job Zwiers and Wil Janssen. Partial order based design of concurrent systems. In J.W. de Bakker, W.-P. de Roever, and G. Rozenberg, editors, Proceedings of the REX School/Symposium on a Decade of Concurrency — Reflections and Perspectives (Noordwijkerhout, The Netherlands, June 1-4, 1993), volume 803 of LNCS, pages 622–684. Springer- Verlag, Berlin-Heidelberg-New York-London-Paris-Tokyo-Hong Kong- Barcelona-Budapest, 1994.